<template>
<div>
  <div class="imgbox">
       <img class="img" src="../../../assets/images/qualityManage/hygl.png" alt="">

  </div>
  <div class="imgbox" style="margin-top: 30px;">
    <img src="../../../assets/images/qualityManage/hygl2.png" alt="">
  </div>
   
</div>
</template>
<script>
</script>
<style lang="less" scoped>
.imgbox{
  
  display: flex;
  justify-content: center;
  width: 100%;
  img{
    width: 90%;
  }
}
</style>
