<template>
  <div class="monitor">monitor</div>
</template>

<script>
export default {}
</script>

<style lang="less" scoped>
.monitor {
  width: 100%;
  height: 100%;
  background: url(../assets/temp/8.png) no-repeat;
  background-size: 100% 100%;
}
</style>
